A I P S L E T T E R

Volume XL, Number 2: December 31, 2021

A newsletter for users of the NRAO Astronomical Image Processing System

Written by a cast of AIPS

Edited by

Eric W. Greisen

National Radio Astronomy Observatory P.O. Box O, Socorro, NM 87801–0387 575–835–7236; Fax 575–835–7027

     daip@nrao.edu
http://www.aips.nrao.edu/

General developments in AIPS

COVID-19

Sadly, the Covid-19 pandemic continues. The NRAO has returned to something like the “new normal.” We are required to be fully vaccinated and to wear masks when in public spaces in NRAO facilities. We may remove the masks when in our offices with the door closed. Work from home is permitted and, perhaps, even encouraged. All of this has reduced the normal interactions between staff.

NRAO has purchased a Mac mini with the new ARM M1 chip for AIPS. Work has begun on the port to that architecture. This requires using a very modern version of gfortran (11.0.0), which turns out to treat some things as errors that really are not. With great care, AIPS code calls subroutines with variables that can be of integer or float type and can be scalars or arrays. Work on trying to satisfy the compiler is continuing. Note that the binary release of AIPS for Intel Macs works fine on ARM Macs and will continue to do so for several years.

The Covid status means that your editor would like to find additional, preferably interesting, things to do. If you find any problems with AIPS or have any suggestions for new or improved functions, please do not hesitate to e-mail me.

AIPSLetter publication

We have discontinued paper copies of the AIPSLetter entirely, at least for this issue. The AIPSLetter will be available in PostScript and pdf formats as always from the web site listed above. New issues will be announced in the NRAO eNews mailing and on the bananas and mnj list servers.

Current and future releases

We have formal AIPS releases on an annual basis. We recommend a full binary installation method for both the frozen and development versions for MacIntosh OS/X (Intel chips only), and Linux (32- and 64-bit) systems, but all architectures can do a full installation from the source files. There are no longer binary versions available for Solaris and Mac PPC chip architectures. If you develop AIPS code locally or have system managers that forbid the use of rsync or cvs, you will need to do a source-level installation. The current release is called 31DEC21 and is now “frozen.” If you took a development copy of this version at some earlier date, you should use the “Midnight Job” (MNJ) to bring it up to date. You need to run a MNJ only once in 2022 to convert your copy of 31DEC21 into the frozen version. However, when patches to 31DEC21 are announced in 2022, you may apply them with the MNJ. This AIPSLetter is intended to advise you of corrections and improvements in this release.

We have begun a new version, called 31DEC22, which is now under development by the AIPS Group. You may fetch and install a complete copy of this version at any time. Having fetched 31DEC22, you may update your installation whenever you want by running the MNJ. This uses cvs, rsync, and/or transaction files to copy all changed text files and then to copy the binary files or to compile the code selectively based on the code changes and compilations we have done. We expect users to take their source-only or binary version of 31DEC22 AIPS over the Internet (via anonymous ftp). Both versions require you to copy the installation procedure install.pl via ftp; the source-only version also requires you to ftp the 175-Mbyte

31DEC22.tar.gz compressed tar file. Binary installations use only rsync, while locally compiled versions

also use cvs. Linux sites will almost certainly have cvs installed; other sites may have installed it along with other GNU tools. Secondary MNJs will still be possible using ssh or rcp or NFS as with previous releases. We have found that cvs works very well, although it has one quirk. If a site modifies a file locally, but in an AIPS-standard directory, cvs will detect the modification and attempt to reconcile the local version with the NRAO-supplied version. This usually produces a file that will not compile or run as intended. Use a new name for the task or put a copy of the task and its help file in a private disk area instead.

AIPS is now copyright © 1995 through 2021 by Associated Universities, Inc., NRAO’s parent corporation, but may be made freely available under the terms of the Free Software Foundation’s General Public License (GPL). This means that User Agreements are no longer required, that AIPS may be obtained via anonymous ftp without contacting NRAO, and that the software may be redistributed (and/or modified), under certain conditions. The full text of the GPL can be found in the 15JUL95 AIPSLetter and is included with every distribution in file $AIPS ROOT/release-name/COPYING.

Installing a new version

If compiling locally, new releases must be installed from the tar ball for that release. 31DEC15 and later versions contain improvements to the code which should make local compilation more reliable. If using the binary installation, a full new installation must also be done with rsync. When installing a new AIPS release in a system that already has a previous release, we recommend that install.pl be used and that the previous release be left in place, at least until the new installation has been verified. If you do this, then you will not have to re-edit the disk, printer, and tape lists and can simply skip all those pages in the

install.pl menus. The old $HOME/.AIPSRC file may be left in place, but it will need to be edited. The

lines giving the DOWNLOADED and UNPACKED parameters should be cleared and the CCOMOPT line should be changed to point to the current release rather than the previous one. If you have made a special version of

do daily.host, you should preserve it under a new name and restore it after the install. If you have an odd

set of AIPS versions, the $AIPS ROOT/AIPSPATH.*SH files may need to be edited after the install to set the desired versions. The file $SYSLOCAL/UPDCONFIG also needs to be edited to correct your e-mail address(es).

31DEC09 contains a change in the format of antenna files. Previous releases will not understand the antenna

coordinates for arrays that were traditionally left-handed (VLBI primarily). The format change occurs automatically when any 31DEC09 or later antenna-file specific code reads the file, after which older releases will have difficulties. 31DEC15 contains a change in the headers of uv data sets which will not be understood by previous versions. 31DEC20 contains a change to the XAS TV server which will cause problems with older versions. Note that the only version which we will patch for major errors is 31DEC21; even 31DEC20 will no longer be changed.

Improvements of interest to users in 31DEC21

In the latter half of 2021, new tasks appeared including CMPLX to perform complex mathematical operations on pairs of complex images, DT2PD to convert the new D-term text files to PD tables, MARSP to find the rotation measure affecting a planetary polarization image, PCABL to fill in cable cal values to a PCLOD-created

PC table, PCDIV to change pulse-cal table amplitudes from TY or SY system temperatures, and VLBSY and
VLBCD to create SY and CD tables from VLBA secondary text files. In the first six months of the year new tasks appeared including DGAUS to correct a model visibility file made with a Clean image for the Clean beam, IANTB to produce an ANTAB file from the GC and TY tables, VBRFI to compute statistics from autocorrelation data, PLRFI to make plots from the text file written by VBRFI, and SHAHO to flag holography data for shadowing. The new verbs are TVBANDW to perform several black-and-white enhancement schemes and TVDATA (also called TVFACTS) to remind the user of the parameters of the TV display. A pipeline RUN file, called VLBARFI, was developed to study RFI at the VLBA sites.

Normally, bugs which appear in an AIPS TST version and then are fixed in that same version before its release get little or no discussion in the AIPSLetter. Since a rather large number of sites now install the

TST version of AIPS during its development, this is somewhat of an oversight. We urge you to run the

“Midnight Job” at least once after 31DEC21 is frozen to bring it up to date and to fix all bugs of this sort. We urge active sites to use the MNJ and, when something odd occurs, to examine CHANGE.DOC using the cgi tool available from the AIPS documentation web page (http://www.aips.nrao.edu/aipsdoc.html). Please do not hesitate to contact us via the NRAO help desk (https://help.nrao.edu) or via e-mail daip@nrao.edu with any questions or suspicions that there are problems.

Imaging and Display

IMAGR was corrected to handle the situation where FLUX > 0 with no Clean boxes yet defined. This caused the task to stop Cleaning before it started when auto-boxing was requested, as in VLBARUN.

UVPLT was given the option to do time averaging prior to plotting the data.

Axis labeling was reviewed systematically to insure that the upper and lower level routines deciding on which ticks get plotted were doing it both correctly and with the same algorithms. Numerous corrections were made.

Contour plots will now display only those contour levels actually used. This change was made in a variety of secondary tasks and has now been made in the main tasks, KNTR, PCNTR, GREYS, and CNTR.

RGBLEVS will now be displayed by KNTR and PCNTR in normal fonts rather than the line-drawing fonts.

The addition of an intensity for characters in the XAS display server made this change possible.

UV data

BPASS was corrected for a bad error in which the reference antenna could change part way through the spectrum due to channel-level flagging. The reference antenna is now chosen once for each solution. It now writes the calibration and BP version information to the history even for single-source files.

BPEDT was given the option to edit the BP table itself rather than just the uv data. Blanked channels may be given interpolated values on output. A SET TIME RANGE option was added as well, including to PCEDT.

TVFLG, SPFLG, and FTFLG had the sizes of their large buffers corrected. It is not clear how they were able to function previously. These tasks now warn the user when a pre-existing grid file is being used.

WIPER was given the complicated option to display the data on a baseline number axis (both 1-2 and 2-1 are displayed).

DOPOL application routines did not understand the codes from the PD table read routine. Accordingly, they would die when they should not when some but not all solutions are flagged.

PP tables are created by RLDIF and XYDIF in spectral mode, saving the phase correction spectrum.

The format of the table was changed to include a column of the uncertainties. POSSM was changed to plot the PP data including the error bars and to forbid NPLOTS > 0 for such tables.

Index tables are now written by a number of tasks that could not do so previously.

VLBI matters

The VLB data reduction pipeline VLBARUN continued to get attention in the reporting period. This caused several changes to be made to the VLBAUTIL procedures. These are (1) VLBAAMP will skip the ACSCL step if there is no BP table and supports the ICHANSEL adverb used by ACSCL, (2) VLBALOAD to support the DOCONCAT adverb rather than forcing it to be true, and (3) VLBABPSS to support a new adverb BPASS5 to control the normalization of the data, setting BPASSPRM(5).

VLBARUN changes include

1. DOCONCAT is false when calling VLBALOAD

2. CHKNAME was replaced with NAMEGET which is more reliable and one place that assumed INSEQ was 1 was corrected.

3. The TEC section now deletes the /tmp/jpl* data file it read.

4. Corrected DOPLOT = 2 mode to plot the correct CL and SN tables and to report the correct plot file numbers at the end. The RFLAG plot files are now also reported.

5. Added a procedure to set the correct Stokes; VPLOT does not accept ’HALF’ when there is only 1 polarization.

6. Changed to delete any pre-existing message output file.

7. Changed to display the output of LISTR ’SCAN’ mode after the INPUTS in the message output file.

8. Changed the UVPLT section to display 3 plots: channel averaged data time smoothed, fully time and channel averaged data versus baseline length, and no averaging versus baseline length.

9. Changed auto-boxing in IMAGR to take only one box per major cycle.

10. Added BPASS5 to allow control of BPASSPRM(5).

11. Corrected handling of CALSOUR(2) = ’*’.

12. Corrected the usage of the procedure that finds the main input file name.

13. Fixed the loop running RFLAG to prevent an infinite loop.

14. Dropped the use of the TV to set the colors for the RFLAG plots.

15. An option to use CALIB rather than FRING in the time-dependent calibration and/or the self-cal was added.

VLBARFI had the meaning of DOPLOT changed to allow better selection of plots and to allow DOBAND < 0 to

omit BPASS. It was then modified to support a generic calling procedure by finding CALSOUR and TIMERANG where possible. Changes like those listed above were also made. A script named VLBAWIDE was written to invoke VLBARFI on a set of input data sets such as could be observed to cover much of the VLBA’s available frequencies.

Four new tasks were written to enable testing of VLBA matters, particularly the issue of fluxes from RDBE 2. PCABL copies the cable cal values from the small PC table shipped with the data to the large PC table created by PCLOD from a secondary text file. VLBSY reads a VLBA total power text file to create an EVLAlike SY table while VLBCD reads a VLBA cal text file to extract the noise tube values into an EVLA-like CD table. These two tables are widely understood in AIPS. PCDIV copies a PC table multiplying or dividing by the system temperature found from a TY pr SY table.

VBGLU was changed to allow the second data set to have been observed on a completely different day.

It can then be used to join two data sets with different frequencies so long as they have the same number of spectral channels in each spectral window and the same number of spectral windows (“IFs” in AIPS-speak). IMAGR cannot handle two independent input files, so, at the cost of wasted disk space, this option allows an image to be made from two or more data sets.

BASRM is designed to fit a polynomial baseline to autocorrelation data and remove it. The task was substantially rewritten and now does what it is supposed to do.

VLA and Analysis

CMPLX is a new task to perform addition, multiplication, and division on two “complex” images where a complex image is actually two images either real and imaginary or amplitude and phase.

DT2PD is a new task to convert a D-term text file to a standard spectral polarization D-term (PD) table. This is the first of a number of tasks to implement absolute D-term calibration of VLA data.

ELINT was changed to allow data from all IFs to be included in a single fit, to plot multiple IFs in a single plot, to scale the fits to 1.0 at a specified elevation, and to improve the displays of the fits and the coloring of the plots. Updating a CL table is now only an option.

HOLOG now can use CELLSIZE to set the image cell size, avoiding the standard, frequency-dependent cell sizes.

PBEAM now can plot the smooth model with data samples and the residuals versus radius, avoiding the foibles of the gridding process. Changed to read multiple groups of data, allowing the construction of spectral cubes. Additional annotation including which contour levels were used was added to the plots. Fitting of power data (moving antenna with moving antenna) was corrected and the option to fit in power was added.

PANEL was given a new plot type to show which panel corner is which over the entire antenna surface.

The theoretical gain displayed was corrected.

MARSP is a new task which compares the polarization angles around an image of a planet to measure how far off they are from radial. In other words, to determine what rotation measure affected the data.

BDF2AIPS was given the DOALL option to allow writing of the pointing (PT) table. These tables are now written every 0.1 seconds and so are grossly large and of no use to AIPS. Therefore, the default is to omit these tables.

General

Input lines to AIPS may now be 128 characters in length, up from the classical 80.

DELAY now takes an optional immediate argument for the time delay.

STALIN now limits the deleted history records to those matching PRTASK.

Documentation was updated systematically, including the CookBook, ABOUT files, the TAB-completion file, and numerous adverb help files. Verbs EXTLIST and PLGET were changed for changes in plot tasks.

FREESPAC had its format changed to allow for even larger disk areas such as on NRAO’s Lustre systems.

Patch Distribution for 31DEC20

Because of the extensive use of binary installations, we now patch the master copy of the most recently frozen version. Older versions are not corrected even for egregious errors. Thus, 31DEC20 was patched during 2021 and 31DEC21 will be patched as needed during 2022. Your copy of them may be corrected simply by running a Midnight Job. Information about patches and the code may be found using links from the main AIPS web page or by anonymous ftp to the NRAO server ftp.aoc.nrao.edu. Documentation about patches to a release is placed on this site at pub/software/aips/release-name and the code is placed in suitable sub-directories below this. Patches to older releases are kept here as well, but they will require local compilation.

The 31DEC20 release is no longer available for installation and will no longer receive patches even for egregious errors. It had a number of important patches during 2021. They are

1. SPLIT and CLIP would always say that it is not calibrating anything despite the adverbs. 2021-01-20 2. SPRMS had a slight error in labeling frequency and the Y axis. 2021-02-23 3. CLIP generated a false error message. 2021-04-14 4. VLBARUN needed to reset IMSIZE after UVPLT calls; also allow PostScript out when convert does not work. 2021-04-22 5. UVPLT could decide to plot phases from 0 to 360 ignoring any user-specified range. 2021-04-27 6. LISTR listed single-source velocities incorrectly. 2021-04-27 7. BPASS could change reference antenna in the middle of a spectrum. 2021-07-16 8. TVFLG, SPFLG, FTFLG did not define enough memory. 2021-07-26 9. IMAGR could quit at the start when a flux limit was specified with auto boxing 2021-10-22

AIPS Distribution

From the NRAO system logs, we count apparent MNJ accesses, downloads of the tar balls, and rsync accesses by unique IP address. Since DSL and some university and other connections may be assigned different IP addresses at different times, this will be a bit of an over-estimate of actual sites. However, a single IP address is often used to provide AIPS to a number of computers, so these numbers are at the same time an under-estimate of the number of computers running current versions of AIPS. In 2021, a total of 399 different IP addresses downloaded the frozen form of 31DEC20 and 659 IP addresses downloaded

31DEC21 in tarball or binary form. With the change to the MNJ (rsync only) we are unable even to guess

how many sites have run the MNJ. The total number of unique IP addresses in these five lists was 1215. The plot of numbers versus time and the table shows that 2021 was substantially behind 2020.

TST NEW Total

year TST name NEW name TST NEW binary binary unique 2004 31DEC04 31DEC03 808 196 1276 2005 31DEC05 31DEC04 832 246 299 48 1460 2006 31DEC06 31DEC05 806 191 402 94 1398 2007 31DEC07 31DEC06 965 277 669 161 1811 2008 31DEC08 31DEC07 1058 246 986 303 2107 2009 31DEC09 31DEC08 1228 307 1082 478 2399 2010 31DEC10 31DEC09 1228 307 1203 477 2416 2011 31DEC11 31DEC10 1105 270 1064 424 2228 2012 31DEC12 31DEC11 940 284 1028 396 1698 2013 31DEC13 31DEC12 1014 307 990 443 1937 2014 31DEC14 31DEC13 1045 333 848 431 1843 2015 31DEC15 31DEC14 1104 309 1001 350 1817 2016 31DEC16 31DEC15 878 222 788 372 1330 2017 31DEC17 31DEC16 874 408 768 386 1383 2018 31DEC18 31DEC17 684 368 603 343 1099 2019 31DEC19 31DEC18 754 406 686 388 1155 2020 31DEC20 31DEC19 796 434 750 470 1230 2021 31DEC21 31DEC20 659 399 604 376 1215

December 31, 2021