Center at RA 02 27 4.83000 DEC 61 52 24.6000

W3 (OH) RCP 22237.304 MHz Sum 120 channels

Peak flux = 2.0228E+03 JY/BEAM Levs = 2.0000E+01 * ( -10.0, -5.00, -2.00, -1.00, 1.000, 2.000, 5.000, 10.00, 15.00, 20.00, 30.00, 40.00, 50.00, 60.00, 70.00, 80.00, 90.00, 100.0)

MilliARC SEC

MilliARC SEC

0 -50 -100 -150

50

0

-50

-100

-150