Center at RA 03 19 48.15700 DEC 41 30 42.0300

3C84 IPOL 8414.000 MHZ ICLN Continuum

Peak flux = 2.5898E+00 JY/BEAM Levs = 2.0000E-02 * (-1.00, 1.000, 1.931, 2.683, 3.728, 5.179, 7.197, 10.00, 13.89, 19.31, 26.83, 37.28, 51.79, 71.97, 100.0)

MilliARC SEC

MilliARC SEC

8 6 4 2 0 -2 -4 -6

5

0

-5

-10

-15