V vs U for MDDTL.CALIB.1 Source:3C336 Ants * - * Stokes I IF# 1 Chn# 1

Mega Wavlngth

Mega Wavlngth

-0.4 -0.2 0.0 0.2 0.4

0.4

0.2

0.0

-0.2

-0.4