Amplitude vs UV dist for MDDTL.CALIB.1 Source:3C336 Ants * - * Stokes I IF# 1 Chn# 1

MilliJanskys

Kilo Wavlngth

0 100 200 300 400 500

700

600

500

400

300

200

100

0