Flux vs Time hrs for W51M.DBCON.1 Source: W51M Ants 1 - * Stokes I IF# 1 Chn# 64

From 0/17:04:30 to 0/17:10:00

Kelvins

TIME (HOURS)

17 05 30 06 00 30 07 00 30 08 00 30 09 00

1.6

1.4

1.2

1.0

0.8

0.6

0.4