Ext CC Vers 2 MDDTL.APCLN.1 X-Axis: DELTAX [2(1)] MODU DELTAY [3(1)] Y-Axis: FLUX [1(1)]

MilliJY

MilliDEGREES

0 1 2 3 4 5

3.0

2.5

2.0

1.5

1.0

0.5

0.0