3C295 IPOL 8561.000 MHZ TVLAC.ICLN.1

Plot file version 12 created 15-MAR-1994 16:44:30

Center at RA 14 09 33.40755 DEC 52 26 13.1370 ROT 143.130

MilliJY/BEAM

ARC SEC

-3 -2 -1 0 1 2 3

500

400

300

200

100

0