3C295 RA 14 09 33.50093 DEC 52 26 12.9000 TVLAC.PGEOM.2

Peak flux = 5.8966E-01 JY/BEAM Levs = 1.0000E-03 * ( -5.00, 5.000, 10.00, 20.00, 50.00, 100.0, 200.0, 500.0)

ANGL

MilliRAD--SIN

0.0 0.2 0.4 0.6 0.8 1.0 1.2 1.4

350

300

250

200

150

100

50

0