GREY: 3C295 IPOL 8561.000 MHZ TVLAC.SE.1

Grey scale flux range= -40.0 200.0 MilliJY/BEAM

CONT: 3C295 IPOL 8561.000 MHZ TVLAC.SUBIM.1

Peak contour flux = 6.0413E-01 JY/BEAM Levs = 1.0000E-03 * ( -5.00, 5.000, 20.00, 100.0, 500.0)

DECLINATION (B1950)

RIGHT ASCENSION (B1950)

14 09 33.8 33.6 33.4 33.2 33.0

52 26 1716151413121110 0 50 100 150 200