GREY: NGC6503 IPOL NGC6503.XMOM0.1

Grey scale flux range= 0.052 1.909 Kilo JY/B*M/S

CONT: NGC6503 IPOL NGC6503.XMOM1.1

Peak contour flux = 1.8061E+05 METR/SEC Levs = 4.0000E+04 * ( -3.00, -2.00, -1.00, 0.000, 1.000, 2.000, 3.000, 4.000)

DECLINATION (B1950)

RIGHT ASCENSION (B1950)

17 52

5150494870 18

1614121008060402000.51.01.5