3C295 IPOL 8561.000 MHZ TVLAC.ICLN.1

Plot file version 8 created 15-MAR-1994 16:06:37

Grey scale flux range= 0.0 330.0 MilliJY/BEAM

DECLINATION (B1950)

RIGHT ASCENSION (B1950)

14 09 33.8 33.6 33.4 33.2 33.0

52 26 1716151413121110 0 100 200 300