Ext UK Vers 1 3551708.KCTA.1 X-Axis: ROW NUMB Y-Axis: DELTA_T [1(1)]

MicroSECONDS

Kilo COUNT

0 2 4 6 8 10 12 14 16

4

3

2

1

0

-1

-2