Moon IPOL 88622.053 MHZ Moon.BSGRD.1

Grey scale flux range= 50.0 150.0 K Cont peak flux = 148.77 K Levs = 5.0 * ( -4, -3, -2, -1, 1, 2, 3, 4, 8, 12, 16, 20, 24, 28)

050100

DECLINATION (B1950)

RIGHT ASCENSION (B1950)

09 21 30 00 20 30 00 19 30 00 18 30 00 17 30

12 30

20

10

00

11 50

40

30